<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">NAME C2CWEB WINDOWCOMPAT
DESCRIPTION 'C2CWEB 1.5'
STACKSIZE 0x80000
</pre></body></html>